

/** Start Block Kit CSS: 69-3-4f8cfb8a1a68ec007f2be7a02bdeadd9 **/

.envato-kit-66-menu .e--pointer-framed .elementor-item:before{
	border-radius:1px;
}

.envato-kit-66-subscription-form .elementor-form-fields-wrapper{
	position:relative;
}

.envato-kit-66-subscription-form .elementor-form-fields-wrapper .elementor-field-type-submit{
	position:static;
}

.envato-kit-66-subscription-form .elementor-form-fields-wrapper .elementor-field-type-submit button{
	position: absolute;
    top: 50%;
    right: 6px;
    transform: translate(0, -50%);
		-moz-transform: translate(0, -50%);
		-webmit-transform: translate(0, -50%);
}

.envato-kit-66-testi-slider .elementor-testimonial__footer{
	margin-top: -60px !important;
	z-index: 99;
  position: relative;
}

.envato-kit-66-featured-slider .elementor-slides .slick-prev{
	width:50px;
	height:50px;
	background-color:#ffffff !important;
	transform:rotate(45deg);
	-moz-transform:rotate(45deg);
	-webkit-transform:rotate(45deg);
	left:-25px !important;
	-webkit-box-shadow: 0px 1px 2px 1px rgba(0,0,0,0.32);
	-moz-box-shadow: 0px 1px 2px 1px rgba(0,0,0,0.32);
	box-shadow: 0px 1px 2px 1px rgba(0,0,0,0.32);
}

.envato-kit-66-featured-slider .elementor-slides .slick-prev:before{
	display:block;
	margin-top:0px;
	margin-left:0px;
	transform:rotate(-45deg);
	-moz-transform:rotate(-45deg);
	-webkit-transform:rotate(-45deg);
}

.envato-kit-66-featured-slider .elementor-slides .slick-next{
	width:50px;
	height:50px;
	background-color:#ffffff !important;
	transform:rotate(45deg);
	-moz-transform:rotate(45deg);
	-webkit-transform:rotate(45deg);
	right:-25px !important;
	-webkit-box-shadow: 0px 1px 2px 1px rgba(0,0,0,0.32);
	-moz-box-shadow: 0px 1px 2px 1px rgba(0,0,0,0.32);
	box-shadow: 0px 1px 2px 1px rgba(0,0,0,0.32);
}

.envato-kit-66-featured-slider .elementor-slides .slick-next:before{
	display:block;
	margin-top:-5px;
	margin-right:-5px;
	transform:rotate(-45deg);
	-moz-transform:rotate(-45deg);
	-webkit-transform:rotate(-45deg);
}

.envato-kit-66-orangetext{
	color:#f4511e;
}

.envato-kit-66-countdown .elementor-countdown-label{
	display:inline-block !important;
	border:2px solid rgba(255,255,255,0.2);
	padding:9px 20px;
}

/** End Block Kit CSS: 69-3-4f8cfb8a1a68ec007f2be7a02bdeadd9 **/



/** Start Block Kit CSS: 71-3-d415519effd9e11f35d2438c58ea7ebf **/

.envato-block__preview{overflow: visible;}

/** End Block Kit CSS: 71-3-d415519effd9e11f35d2438c58ea7ebf **/

